Copyright: ©IMSI Capture, Copyright 1998 IMSI
Citation: ©IMSI Capture, Copyright 1998 IMSI


Show Sites Dialog

This dialog box displays the contents of the capture on your computer. It provides a list of the visited web sites and the number of captured resources. The Browse Capture button initiates browsing of the capture on your computer. The Browse Internet button initiates browsing of the site on the Internet. Both browse methods begin from the Start URL specified in this dialog box.


Web Capture Status

This dialog box shows the settings for the current capture and monitors the status of the download process. To start the capture, press the Start button. To pause the capture, press the Pause button. To restart the capture press the Resume button (the label on the button changes from Pause to Resume when the capture is paused). To terminate the capture process before it is finished, press the Stop button. To expand the dialog box and view real time statistics for the download process press the Show Stats button. To the Statistics section of the dialog box, press the Hide Stats button.

When the capture is complete, the page represented by the Start URL opens from your computer.